========================                            NOSview [301]
/spool/help/operator.hlp
========================

USAGE
 O[perator]

DESCRIPTION
 The operator command allows you to "talk" keyboard-to-keyboard
 with the operator of this NOS system. When you select this
 function, a new window will be opened on the operator's console,
 and whatever you type will be visible there.  If the operator is
 present, and types something in return, it will be sent back to
 you.

 When you wish to terminate the chat session, type the escape
 character on your keyboard, and then press <ENTER> or <RETURN>.
 The default escape character is "CTRL-X".  This escape character
 may be changed to whatever you prefer by using the "E[scape]"
 command.

EXAMPLE

 o

